% refcard-letter.tex
%
% Make a reference card that will fit on US letter paper
% (8-1/2 by 11 inches).
%
% Copyright (C) 1996-2020 The Octave Project Developers
%
% See the file COPYRIGHT.md in the top-level directory of this distribution
% or <https://octave.org/COPYRIGHT.html/>.
%
%
% This file is part of Octave.
%
% Octave is free software: you can redistribute it and/or modify it
% under the terms of the GNU General Public License as published by
% the Free Software Foundation, either version 3 of the License, or
% (at your option) any later version.
%
% Octave is distributed in the hope that it will be useful, but
% WITHOUT ANY WARRANTY; without even the implied warranty of
% MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
% GNU General Public License for more details.
%
% You should have received a copy of the GNU General Public License
% along with Octave; see the file COPYING.  If not, see
% <https://www.gnu.org/licenses/>.

\def\refcardsize{letter}
\input refcard.tex
